%%
%% Sample TeX file for the HRMS Dijon 2023 abstracts
%% 
%% Lines (or parts of) beginning with at least one '%' are comments 
%% and are silently ignored by LaTeX
%%
%% Codings beginning with \ are LaTeX macros, or commands.
%% They are used to tell the LaTeX parser how to format the document.
%% All the macros below are mandatory.
%%
%% Various informations about latex may be found at
%%
%%   http://en.wikibooks.org/wiki/LaTeX
%%
%% *-----------------------------------------------------------------------------------------*
\documentclass[11pt]{article}

\usepackage{hrms}  %% Page settings, style ... for the HRMS abstract book.

%% *-----------------------------------------------------------------------------------------*

\title{MENLO SYSTEMS' SOLUTIONS FOR HIGH PRECISION SPECTROSCOPY}

%% Note that \author and \address macros must be paired.
%% The names of authors must also appear IN CAPITALS.
%% The name(s) of author(s) presenting the work is(are) usually underlined.

\author{\underline{\FirstName A. \LastName AUBOURG},
  \FirstName S. \LastName DE VEGA}
\address{Menlo Systems GmbH, Christina Mariel, Bunsenstr. 5, 82152 Martinsried, Germany}

%% The \FirstName and \LastName macros are mandatory for each author
%% to make sure that the author index is properly auto-generated.
%% Otherwise, these macros do nothing in particular.

%% Add or remove \author and \address pair(s) below to suite your needs
%\author{\underline{\FirstName G. \LastName HHHHH-IIIIIII Jr},
%  \FirstName J. \LastName KKKKKKKKKK,
%  \underline{\FirstName L. \LastName MM NN PPPPPP}}
%\address{Address of the institution for the second author(s)}

%% *-----------------------------------------------------------------------------------------*

%% Place below other \usepackage{ ... }, if you need other packages.
%% See http://www.tug.org/texlive/doc.html for a description of available packages.

%% The macros below will change the page head and foot.
%% Please, do not modify the content of the \fancyhead macro nor the \fancyfoot line.
\usepackage{fancyhdr}
\pagestyle{fancy}
\fancyhead[C]{{\footnotesize \textit{HRMS, 28th Colloquium, Dijon, France,
  Aug. 28 - Sept. 1, 2023}}}
\fancyfoot[C]{}
\renewcommand{\headrulewidth}{0.6pt}
\renewcommand{\footrulewidth}{0.6pt}

%% The hyperref package allows to include hyperlinks in a document.
%% See the instructions for abstract submission for more details.
%% WARNING: Make sure that this package comes LAST since it re-defines many LaTeX macros.
\usepackage[colorlinks=true,urlcolor=blue,linkcolor=blue,citecolor=blue]{hyperref}
\voffset -.65 cm

%% *-----------------------------------------------------------------------------------------*

\category {15,3}
\begin{document}

\maketitle  %% This will also build the list of author(s) and addresse(s).

%% Index macro(s): see the abstract samples and the instructions
%% Remove the %% to account for the index item(s)
%% \index{Item1}
%% \index{Item2}

%% Place the body of your abstract below.
Menlo Systems is a leading developer and global supplier of instrumentation for precision metrology. The company, with headquarters in Martinsried near Munich, is known for its Nobel Prize winning optical frequency comb technology. Our main product lines are optical frequency combs, solutions for time and frequency distribution, ultrastable lasers, terahertz systems, and femtosecond lasers.

Recently, Menlo Systems introduced two new products for applications in the important fingerprint region for high accuracy spectroscopy or nanoFTIR. The ``YLMO Mid-I'' is a femtosecond fiber-laser with a tunable wavelength over 3--5~$\mu$m and the ``Mid-IR Comb'' provides stabilized modes (enabling dual-comb spectroscopy setups) from 3~$\mu$m up to 14~$\mu$m.

\end{document}
