\begin{filecontents}{figure_methane_Titan.eps}
%!PS-Adobe-3.0 EPSF-3.0
%%Creator: cairo 1.16.0 (https://cairographics.org)
%%CreationDate: Fri Jun 16 14:54:28 2023
%%Pages: 1
%%DocumentData: Clean7Bit
%%LanguageLevel: 2
%%BoundingBox: 0 0 507 327
%%EndComments
%%BeginProlog
50 dict begin
/q { gsave } bind def
/Q { grestore } bind def
/cm { 6 array astore concat } bind def
/w { setlinewidth } bind def
/J { setlinecap } bind def
/j { setlinejoin } bind def
/M { setmiterlimit } bind def
/d { setdash } bind def
/m { moveto } bind def
/l { lineto } bind def
/c { curveto } bind def
/h { closepath } bind def
/re { exch dup neg 3 1 roll 5 3 roll moveto 0 rlineto
      0 exch rlineto 0 rlineto closepath } bind def
/S { stroke } bind def
/f { fill } bind def
/f* { eofill } bind def
/n { newpath } bind def
/W { clip } bind def
/W* { eoclip } bind def
/BT { } bind def
/ET { } bind def
/BDC { mark 3 1 roll /BDC pdfmark } bind def
/EMC { mark /EMC pdfmark } bind def
/cairo_store_point { /cairo_point_y exch def /cairo_point_x exch def } def
/Tj { show currentpoint cairo_store_point } bind def
/TJ {
  {
    dup
    type /stringtype eq
    { show } { -0.001 mul 0 cairo_font_matrix dtransform rmoveto } ifelse
  } forall
  currentpoint cairo_store_point
} bind def
/cairo_selectfont { cairo_font_matrix aload pop pop pop 0 0 6 array astore
    cairo_font exch selectfont cairo_point_x cairo_point_y moveto } bind def
/Tf { pop /cairo_font exch def /cairo_font_matrix where
      { pop cairo_selectfont } if } bind def
/Td { matrix translate cairo_font_matrix matrix concatmatrix dup
      /cairo_font_matrix exch def dup 4 get exch 5 get cairo_store_point
      /cairo_font where { pop cairo_selectfont } if } bind def
/Tm { 2 copy 8 2 roll 6 array astore /cairo_font_matrix exch def
      cairo_store_point /cairo_font where { pop cairo_selectfont } if } bind def
/g { setgray } bind def
/rg { setrgbcolor } bind def
/d1 { setcachedevice } bind def
/cairo_data_source {
  CairoDataIndex CairoData length lt
    { CairoData CairoDataIndex get /CairoDataIndex CairoDataIndex 1 add def }
    { () } ifelse
} def
/cairo_flush_ascii85_file { cairo_ascii85_file status { cairo_ascii85_file flushfile } if } def
/cairo_image { image cairo_flush_ascii85_file } def
/cairo_imagemask { imagemask cairo_flush_ascii85_file } def
%%EndProlog
%%BeginSetup
%%EndSetup
%%Page: 1 1
%%BeginPageSetup
%%PageBoundingBox: 0 0 507 327
%%EndPageSetup
q 0 0 507 327 rectclip
1 0 0 -1 0 327 cm q
0 g
0.425198 w
0 J
0 j
[] 0.0 d
2.5 M q 1 0 0 -1 0 0 cm
52.5 -283.676 m 506.047 -283.676 l S Q
q 1 0 0 -1 0 0 cm
109.188 -283.676 m 109.188 -269.504 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
103.156 -294.906 m 101.766 -295.359 l 101.312 -296.289 l 101.312 -297.199
 l 101.766 -298.133 l 102.703 -298.613 l 104.547 -299.07 l 105.934 -299.527
 l 106.867 -300.457 l 107.352 -301.398 l 107.352 -302.781 l 106.867 -303.691
 l 106.414 -304.172 l 105.023 -304.625 l 103.156 -304.625 l 101.766 -304.172
 l 101.312 -303.691 l 100.855 -302.781 l 100.855 -301.398 l 101.312 -300.457
 l 102.25 -299.527 l 103.637 -299.07 l 105.48 -298.613 l 106.414 -298.133
 l 106.867 -297.199 l 106.867 -296.289 l 106.414 -295.359 l 105.023 -294.906
 l 103.156 -294.906 l S Q
q 1 0 0 -1 0 0 cm
112.906 -294.906 m 111.52 -295.359 l 110.582 -296.742 l 110.129 -299.07
 l 110.129 -300.457 l 110.582 -302.781 l 111.52 -304.172 l 112.906 -304.625
 l 113.844 -304.625 l 115.23 -304.172 l 116.137 -302.781 l 116.621 -300.457
 l 116.621 -299.07 l 116.137 -296.742 l 115.23 -295.359 l 113.844 -294.906
 l 112.906 -294.906 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
222.578 -283.676 m 222.578 -269.504 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
210.98 -296.742 m 211.922 -296.289 l 213.309 -294.906 l 213.309 -304.625
 l S Q
q 1 0 0 -1 0 0 cm
221.645 -294.906 m 220.254 -295.359 l 219.316 -296.742 l 218.867 -299.07
 l 218.867 -300.457 l 219.316 -302.781 l 220.254 -304.172 l 221.645 -304.625
 l 222.578 -304.625 l 223.969 -304.172 l 224.898 -302.781 l 225.355 -300.457
 l 225.355 -299.07 l 224.898 -296.742 l 223.969 -295.359 l 222.578 -294.906
 l 221.645 -294.906 l S Q
q 1 0 0 -1 0 0 cm
230.914 -294.906 m 229.52 -295.359 l 228.617 -296.742 l 228.137 -299.07
 l 228.137 -300.457 l 228.617 -302.781 l 229.52 -304.172 l 230.914 -304.625
 l 231.848 -304.625 l 233.238 -304.172 l 234.172 -302.781 l 234.625 -300.457
 l 234.625 -299.07 l 234.172 -296.742 l 233.238 -295.359 l 231.848 -294.906
 l 230.914 -294.906 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
335.965 -283.676 m 335.965 -269.504 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
324.371 -296.742 m 325.309 -296.289 l 326.691 -294.906 l 326.691 -304.625
 l S Q
q 1 0 0 -1 0 0 cm
332.707 -297.199 m 332.707 -296.742 l 333.188 -295.812 l 333.641 -295.359
 l 334.578 -294.906 l 336.418 -294.906 l 337.355 -295.359 l 337.809 -295.812
 l 338.289 -296.742 l 338.289 -297.68 l 337.809 -298.613 l 336.898 -300.004
 l 332.25 -304.625 l 338.742 -304.625 l S Q
q 1 0 0 -1 0 0 cm
344.301 -294.906 m 342.91 -295.359 l 342.004 -296.742 l 341.52 -299.07 
l 341.52 -300.457 l 342.004 -302.781 l 342.91 -304.172 l 344.301 -304.625
 l 345.23 -304.625 l 346.625 -304.172 l 347.559 -302.781 l 348.012 -300.457
 l 348.012 -299.07 l 347.559 -296.742 l 346.625 -295.359 l 345.23 -294.906
 l 344.301 -294.906 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
449.352 -283.676 m 449.352 -269.504 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
437.758 -296.742 m 438.688 -296.289 l 440.082 -294.906 l 440.082 -304.625
 l S Q
q 1 0 0 -1 0 0 cm
450.285 -294.906 m 445.637 -301.398 l 452.605 -301.398 l S Q
q 1 0 0 -1 0 0 cm
450.285 -294.906 m 450.285 -304.625 l S Q
q 1 0 0 -1 0 0 cm
457.684 -294.906 m 456.297 -295.359 l 455.391 -296.742 l 454.906 -299.07
 l 454.906 -300.457 l 455.391 -302.781 l 456.297 -304.172 l 457.684 -304.625
 l 458.621 -304.625 l 460.012 -304.172 l 460.941 -302.781 l 461.398 -300.457
 l 461.398 -299.07 l 460.941 -296.742 l 460.012 -295.359 l 458.621 -294.906
 l 457.684 -294.906 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
52.5 -283.676 m 52.5 -276.59 l S Q
q 1 0 0 -1 0 0 cm
80.848 -283.676 m 80.848 -276.59 l S Q
q 1 0 0 -1 0 0 cm
137.539 -283.676 m 137.539 -276.59 l S Q
q 1 0 0 -1 0 0 cm
165.887 -283.676 m 165.887 -276.59 l S Q
q 1 0 0 -1 0 0 cm
194.23 -283.676 m 194.23 -276.59 l S Q
q 1 0 0 -1 0 0 cm
250.926 -283.676 m 250.926 -276.59 l S Q
q 1 0 0 -1 0 0 cm
279.27 -283.676 m 279.27 -276.59 l S Q
q 1 0 0 -1 0 0 cm
307.617 -283.676 m 307.617 -276.59 l S Q
q 1 0 0 -1 0 0 cm
364.312 -283.676 m 364.312 -276.59 l S Q
q 1 0 0 -1 0 0 cm
392.66 -283.676 m 392.66 -276.59 l S Q
q 1 0 0 -1 0 0 cm
421.004 -283.676 m 421.004 -276.59 l S Q
q 1 0 0 -1 0 0 cm
477.699 -283.676 m 477.699 -276.59 l S Q
q 1 0 0 -1 0 0 cm
506.047 -283.676 m 506.047 -276.59 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
206.141 -313.043 m 208.465 -322.793 l 210.785 -313.043 l 213.113 -322.793
 l 215.406 -313.043 l S Q
q 1 0 0 -1 0 0 cm
223.289 -316.305 m 223.289 -322.793 l S Q
q 1 0 0 -1 0 0 cm
223.289 -317.695 m 222.383 -316.758 l 221.441 -316.305 l 220.059 -316.305
 l 219.121 -316.758 l 218.188 -317.695 l 217.73 -319.082 l 217.73 -320.02
 l 218.188 -321.406 l 219.121 -322.316 l 220.059 -322.793 l 221.441 -322.793
 l 222.383 -322.316 l 223.289 -321.406 l S Q
q 1 0 0 -1 0 0 cm
226.094 -316.305 m 228.871 -322.793 l 231.648 -316.305 l S Q
q 1 0 0 -1 0 0 cm
233.977 -319.082 m 239.531 -319.082 l 239.531 -318.148 l 239.078 -317.238
 l 238.594 -316.758 l 237.688 -316.305 l 236.27 -316.305 l 235.363 -316.758
 l 234.43 -317.695 l 233.977 -319.082 l 233.977 -320.02 l 234.43 -321.406
 l 235.363 -322.316 l 236.27 -322.793 l 237.688 -322.793 l 238.594 -322.316
 l 239.531 -321.406 l S Q
q 1 0 0 -1 0 0 cm
242.762 -316.305 m 242.762 -322.793 l S Q
q 1 0 0 -1 0 0 cm
242.762 -318.148 m 244.18 -316.758 l 245.086 -316.305 l 246.477 -316.305
 l 247.41 -316.758 l 247.863 -318.148 l 247.863 -322.793 l S Q
q 1 0 0 -1 0 0 cm
251.578 -316.305 m 251.578 -320.926 l 252.059 -322.316 l 252.969 -322.793
 l 254.355 -322.793 l 255.289 -322.316 l 256.68 -320.926 l S Q
q 1 0 0 -1 0 0 cm
256.68 -316.305 m 256.68 -322.793 l S Q
q 1 0 0 -1 0 0 cm
260.395 -316.305 m 260.395 -322.793 l S Q
q 1 0 0 -1 0 0 cm
260.395 -318.148 m 261.781 -316.758 l 262.719 -316.305 l 264.105 -316.305
 l 265.043 -316.758 l 265.496 -318.148 l 265.496 -322.793 l S Q
q 1 0 0 -1 0 0 cm
265.496 -318.148 m 266.887 -316.758 l 267.816 -316.305 l 269.207 -316.305
 l 270.145 -316.758 l 270.598 -318.148 l 270.598 -322.793 l S Q
q 1 0 0 -1 0 0 cm
274.312 -313.043 m 274.312 -322.793 l S Q
q 1 0 0 -1 0 0 cm
274.312 -317.695 m 275.219 -316.758 l 276.148 -316.305 l 277.543 -316.305
 l 278.48 -316.758 l 279.414 -317.695 l 279.867 -319.082 l 279.867 -320.02
 l 279.414 -321.406 l 278.48 -322.316 l 277.543 -322.793 l 276.148 -322.793
 l 275.219 -322.316 l 274.312 -321.406 l S Q
q 1 0 0 -1 0 0 cm
282.645 -319.082 m 288.23 -319.082 l 288.23 -318.148 l 287.746 -317.238
 l 287.297 -316.758 l 286.355 -316.305 l 284.969 -316.305 l 284.035 -316.758
 l 283.129 -317.695 l 282.645 -319.082 l 282.645 -320.02 l 283.129 -321.406
 l 284.035 -322.316 l 284.969 -322.793 l 286.355 -322.793 l 287.297 -322.316
 l 288.23 -321.406 l S Q
q 1 0 0 -1 0 0 cm
291.461 -316.305 m 291.461 -322.793 l S Q
q 1 0 0 -1 0 0 cm
291.461 -319.082 m 291.914 -317.695 l 292.852 -316.758 l 293.785 -316.305
 l 295.176 -316.305 l S Q
q 1 0 0 -1 0 0 cm
312.324 -311.199 m 303.992 -326.508 l S Q
q 1 0 0 -1 0 0 cm
327.633 -317.695 m 326.691 -316.758 l 325.789 -316.305 l 324.371 -316.305
 l 323.465 -316.758 l 322.523 -317.695 l 322.074 -319.082 l 322.074 -320.02
 l 322.523 -321.406 l 323.465 -322.316 l 324.371 -322.793 l 325.789 -322.793
 l 326.691 -322.316 l 327.633 -321.406 l S Q
q 1 0 0 -1 0 0 cm
330.863 -316.305 m 330.863 -322.793 l S Q
q 1 0 0 -1 0 0 cm
330.863 -318.148 m 332.281 -316.758 l 333.188 -316.305 l 334.578 -316.305
 l 335.512 -316.758 l 335.965 -318.148 l 335.965 -322.793 l S Q
q 1 0 0 -1 0 0 cm
335.965 -318.148 m 337.355 -316.758 l 338.289 -316.305 l 339.68 -316.305
 l 340.613 -316.758 l 341.062 -318.148 l 341.062 -322.793 l S Q
q 1 0 0 -1 0 0 cm
344.016 -314.008 m 347.73 -314.008 l S Q
q 1 0 0 -1 0 0 cm
349.77 -312.336 m 350.191 -312.137 l 350.816 -311.512 l 350.816 -315.855
 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
52.5 -0.211 m 506.047 -0.211 l S Q
q 1 0 0 -1 0 0 cm
109.188 -0.211 m 109.188 -14.387 l S Q
q 1 0 0 -1 0 0 cm
222.578 -0.211 m 222.578 -14.387 l S Q
q 1 0 0 -1 0 0 cm
335.965 -0.211 m 335.965 -14.387 l S Q
q 1 0 0 -1 0 0 cm
449.352 -0.211 m 449.352 -14.387 l S Q
q 1 0 0 -1 0 0 cm
52.5 -0.211 m 52.5 -7.297 l S Q
q 1 0 0 -1 0 0 cm
80.848 -0.211 m 80.848 -7.297 l S Q
q 1 0 0 -1 0 0 cm
137.539 -0.211 m 137.539 -7.297 l S Q
q 1 0 0 -1 0 0 cm
165.887 -0.211 m 165.887 -7.297 l S Q
q 1 0 0 -1 0 0 cm
194.23 -0.211 m 194.23 -7.297 l S Q
q 1 0 0 -1 0 0 cm
250.926 -0.211 m 250.926 -7.297 l S Q
q 1 0 0 -1 0 0 cm
279.27 -0.211 m 279.27 -7.297 l S Q
q 1 0 0 -1 0 0 cm
307.617 -0.211 m 307.617 -7.297 l S Q
q 1 0 0 -1 0 0 cm
364.312 -0.211 m 364.312 -7.297 l S Q
q 1 0 0 -1 0 0 cm
392.66 -0.211 m 392.66 -7.297 l S Q
q 1 0 0 -1 0 0 cm
421.004 -0.211 m 421.004 -7.297 l S Q
q 1 0 0 -1 0 0 cm
477.699 -0.211 m 477.699 -7.297 l S Q
q 1 0 0 -1 0 0 cm
506.047 -0.211 m 506.047 -7.297 l S Q
q 1 0 0 -1 0 0 cm
52.5 -283.676 m 52.5 -0.211 l S Q
q 1 0 0 -1 0 0 cm
52.5 -283.676 m 61.57 -283.676 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
27.215 -275.797 m 28.148 -275.344 l 29.539 -273.926 l 29.539 -283.676 l
 S Q
q 1 0 0 -1 0 0 cm
36.031 -282.742 m 35.578 -283.223 l 36.031 -283.676 l 36.512 -283.223 l
 36.031 -282.742 l S Q
q 1 0 0 -1 0 0 cm
44.395 -273.926 m 39.746 -280.418 l 46.719 -280.418 l S Q
q 1 0 0 -1 0 0 cm
44.395 -273.926 m 44.395 -283.676 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
52.5 -232.148 m 61.57 -232.148 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
27.215 -229.848 m 28.148 -229.363 l 29.539 -227.98 l 29.539 -237.73 l S Q
q 1 0 0 -1 0 0 cm
36.031 -236.793 m 35.578 -237.277 l 36.031 -237.73 l 36.512 -237.277 l 
36.031 -236.793 l S Q
q 1 0 0 -1 0 0 cm
45.781 -229.363 m 45.301 -228.457 l 43.91 -227.98 l 43.004 -227.98 l 41.617
 -228.457 l 40.68 -229.848 l 40.227 -232.172 l 40.227 -234.469 l 40.68 -236.336
 l 41.617 -237.277 l 43.004 -237.73 l 43.457 -237.73 l 44.848 -237.277 l
 45.781 -236.336 l 46.23 -234.949 l 46.23 -234.469 l 45.781 -233.078 l 44.848
 -232.172 l 43.457 -231.691 l 43.004 -231.691 l 41.617 -232.172 l 40.68 
-233.078 l 40.227 -234.469 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
52.5 -180.613 m 61.57 -180.613 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
27.215 -178.316 m 28.148 -177.832 l 29.539 -176.445 l 29.539 -186.195 l
 S Q
q 1 0 0 -1 0 0 cm
36.031 -185.258 m 35.578 -185.711 l 36.031 -186.195 l 36.512 -185.711 l
 36.031 -185.258 l S Q
q 1 0 0 -1 0 0 cm
42.07 -176.445 m 40.68 -176.926 l 40.227 -177.832 l 40.227 -178.77 l 40.68
 -179.703 l 41.617 -180.156 l 43.457 -180.613 l 44.848 -181.09 l 45.781 
-182.031 l 46.23 -182.938 l 46.23 -184.32 l 45.781 -185.258 l 45.301 -185.711
 l 43.91 -186.195 l 42.07 -186.195 l 40.68 -185.711 l 40.227 -185.258 l 
39.746 -184.32 l 39.746 -182.938 l 40.227 -182.031 l 41.133 -181.09 l 42.52
 -180.613 l 44.395 -180.156 l 45.301 -179.703 l 45.781 -178.77 l 45.781 
-177.832 l 45.301 -176.926 l 43.91 -176.445 l 42.07 -176.445 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
52.5 -129.047 m 61.57 -129.047 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
26.309 -127.234 m 26.309 -126.75 l 26.762 -125.844 l 27.215 -125.363 l 
28.148 -124.906 l 30.02 -124.906 l 30.93 -125.363 l 31.41 -125.844 l 31.863
 -126.75 l 31.863 -127.691 l 31.41 -128.621 l 30.477 -130.012 l 25.828 -134.66
 l 32.312 -134.66 l S Q
q 1 0 0 -1 0 0 cm
36.031 -133.723 m 35.578 -134.176 l 36.031 -134.66 l 36.512 -134.176 l 
36.031 -133.723 l S Q
q 1 0 0 -1 0 0 cm
42.52 -124.906 m 41.133 -125.363 l 40.227 -126.75 l 39.746 -129.074 l 39.746
 -130.465 l 40.227 -132.789 l 41.133 -134.176 l 42.52 -134.66 l 43.457 -134.66
 l 44.848 -134.176 l 45.781 -132.789 l 46.23 -130.465 l 46.23 -129.074 l
 45.781 -126.75 l 44.848 -125.363 l 43.457 -124.906 l 42.52 -124.906 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
52.5 -77.512 m 61.57 -77.512 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
26.309 -75.699 m 26.309 -75.219 l 26.762 -74.312 l 27.215 -73.828 l 28.148
 -73.375 l 30.02 -73.375 l 30.93 -73.828 l 31.41 -74.312 l 31.863 -75.219
 l 31.863 -76.156 l 31.41 -77.086 l 30.477 -78.48 l 25.828 -83.098 l 32.312
 -83.098 l S Q
q 1 0 0 -1 0 0 cm
36.031 -82.195 m 35.578 -82.648 l 36.031 -83.098 l 36.512 -82.648 l 36.031
 -82.195 l S Q
q 1 0 0 -1 0 0 cm
40.227 -75.699 m 40.227 -75.219 l 40.68 -74.312 l 41.133 -73.828 l 42.07
 -73.375 l 43.91 -73.375 l 44.848 -73.828 l 45.301 -74.312 l 45.781 -75.219
 l 45.781 -76.156 l 45.301 -77.086 l 44.395 -78.48 l 39.746 -83.098 l 46.23
 -83.098 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
52.5 -25.984 m 61.57 -25.984 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
26.309 -24.137 m 26.309 -23.688 l 26.762 -22.746 l 27.215 -22.293 l 28.148
 -21.84 l 30.02 -21.84 l 30.93 -22.293 l 31.41 -22.746 l 31.863 -23.688 
l 31.863 -24.617 l 31.41 -25.555 l 30.477 -26.945 l 25.828 -31.566 l 32.312
 -31.566 l S Q
q 1 0 0 -1 0 0 cm
36.031 -30.629 m 35.578 -31.113 l 36.031 -31.566 l 36.512 -31.113 l 36.031
 -30.629 l S Q
q 1 0 0 -1 0 0 cm
44.395 -21.84 m 39.746 -28.332 l 46.719 -28.332 l S Q
q 1 0 0 -1 0 0 cm
44.395 -21.84 m 44.395 -31.566 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
52.5 -270.781 m 57.035 -270.781 l S Q
q 1 0 0 -1 0 0 cm
52.5 -257.91 m 57.035 -257.91 l S Q
q 1 0 0 -1 0 0 cm
52.5 -245.012 m 57.035 -245.012 l S Q
q 1 0 0 -1 0 0 cm
52.5 -219.246 m 57.035 -219.246 l S Q
q 1 0 0 -1 0 0 cm
52.5 -206.375 m 57.035 -206.375 l S Q
q 1 0 0 -1 0 0 cm
52.5 -193.48 m 57.035 -193.48 l S Q
q 1 0 0 -1 0 0 cm
52.5 -167.711 m 57.035 -167.711 l S Q
q 1 0 0 -1 0 0 cm
52.5 -154.844 m 57.035 -154.844 l S Q
q 1 0 0 -1 0 0 cm
52.5 -141.949 m 57.035 -141.949 l S Q
q 1 0 0 -1 0 0 cm
52.5 -116.176 m 57.035 -116.176 l S Q
q 1 0 0 -1 0 0 cm
52.5 -103.281 m 57.035 -103.281 l S Q
q 1 0 0 -1 0 0 cm
52.5 -90.41 m 57.035 -90.41 l S Q
q 1 0 0 -1 0 0 cm
52.5 -64.648 m 57.035 -64.648 l S Q
q 1 0 0 -1 0 0 cm
52.5 -51.746 m 57.035 -51.746 l S Q
q 1 0 0 -1 0 0 cm
52.5 -38.875 m 57.035 -38.875 l S Q
q 1 0 0 -1 0 0 cm
52.5 -13.113 m 57.035 -13.113 l S Q
q 1 0 0 -1 0 0 cm
52.5 -0.211 m 57.035 -0.211 l S Q
0.48189 w
q 1 0 0 -1 0 0 cm
1.957 -264.996 m 11.711 -264.996 l S Q
q 1 0 0 -1 0 0 cm
1.957 -264.996 m 1.957 -260.801 l 2.414 -259.41 l 2.895 -258.957 l 3.801
 -258.504 l 4.738 -258.504 l 5.672 -258.957 l 6.125 -259.41 l 6.605 -260.801
 l 6.605 -264.996 l S Q
q 1 0 0 -1 0 0 cm
6.605 -261.738 m 11.711 -258.504 l S Q
q 1 0 0 -1 0 0 cm
5.188 -250.148 m 11.711 -250.148 l S Q
q 1 0 0 -1 0 0 cm
6.605 -250.148 m 5.672 -251.078 l 5.188 -252.02 l 5.188 -253.406 l 5.672
 -254.312 l 6.605 -255.246 l 7.996 -255.699 l 8.898 -255.699 l 10.293 -255.246
 l 11.227 -254.312 l 11.711 -253.406 l 11.711 -252.02 l 11.227 -251.078 
l 10.293 -250.148 l S Q
q 1 0 0 -1 0 0 cm
1.957 -241.328 m 11.711 -241.328 l S Q
q 1 0 0 -1 0 0 cm
6.605 -241.328 m 5.672 -242.262 l 5.188 -243.199 l 5.188 -244.586 l 5.672
 -245.527 l 6.605 -246.43 l 7.996 -246.91 l 8.898 -246.91 l 10.293 -246.43
 l 11.227 -245.527 l 11.711 -244.586 l 11.711 -243.199 l 11.227 -242.262
 l 10.293 -241.328 l S Q
q 1 0 0 -1 0 0 cm
1.957 -238.094 m 2.414 -237.613 l 1.957 -237.16 l 1.504 -237.613 l 1.957
 -238.094 l S Q
q 1 0 0 -1 0 0 cm
5.188 -237.613 m 11.711 -237.613 l S Q
q 1 0 0 -1 0 0 cm
5.188 -228.824 m 11.711 -228.824 l S Q
q 1 0 0 -1 0 0 cm
6.605 -228.824 m 5.672 -229.738 l 5.188 -230.668 l 5.188 -232.062 l 5.672
 -232.992 l 6.605 -233.93 l 7.996 -234.383 l 8.898 -234.383 l 10.293 -233.93
 l 11.227 -232.992 l 11.711 -232.062 l 11.711 -230.668 l 11.227 -229.738
 l 10.293 -228.824 l S Q
q 1 0 0 -1 0 0 cm
5.188 -225.113 m 11.711 -225.113 l S Q
q 1 0 0 -1 0 0 cm
7.062 -225.113 m 5.672 -223.723 l 5.188 -222.789 l 5.188 -221.402 l 5.672
 -220.465 l 7.062 -220.012 l 11.711 -220.012 l S Q
q 1 0 0 -1 0 0 cm
6.605 -211.199 m 5.672 -212.129 l 5.188 -213.035 l 5.188 -214.453 l 5.672
 -215.363 l 6.605 -216.297 l 7.996 -216.75 l 8.898 -216.75 l 10.293 -216.297
 l 11.227 -215.363 l 11.711 -214.453 l 11.711 -213.035 l 11.227 -212.129
 l 10.293 -211.199 l S Q
q 1 0 0 -1 0 0 cm
7.996 -208.418 m 7.996 -202.863 l 7.062 -202.863 l 6.125 -203.316 l 5.672
 -203.773 l 5.188 -204.703 l 5.188 -206.094 l 5.672 -207.031 l 6.605 -207.961
 l 7.996 -208.418 l 8.898 -208.418 l 10.293 -207.961 l 11.227 -207.031 l
 11.711 -206.094 l 11.711 -204.703 l 11.227 -203.773 l 10.293 -202.863 l
 S Q
q 1 0 0 -1 0 0 cm
0.117 -184.781 m 15.395 -193.113 l S Q
q 1 0 0 -1 0 0 cm
3.801 -173.637 m 3.348 -172.699 l 1.957 -171.316 l 11.711 -171.316 l S Q
q 1 0 0 -1 0 0 cm
1.957 -162.98 m 2.414 -164.367 l 3.801 -165.301 l 6.125 -165.754 l 7.516
 -165.754 l 9.84 -165.301 l 11.227 -164.367 l 11.711 -162.98 l 11.711 -162.043
 l 11.227 -160.656 l 9.84 -159.719 l 7.516 -159.27 l 6.125 -159.27 l 3.801
 -159.719 l 2.414 -160.656 l 1.957 -162.043 l 1.957 -162.98 l S Q
q 1 0 0 -1 0 0 cm
2.895 -156.797 m 2.895 -153.086 l S Q
q 1 0 0 -1 0 0 cm
0.43 -148.746 m 4.766 -150.82 l S Q
q 1 0 0 -1 0 0 cm
0.43 -151.645 m 0.43 -148.746 l S Q
q 1 0 0 -1 0 0 cm
1.957 -140.043 m 11.711 -137.75 l 1.957 -135.426 l 11.711 -133.105 l 1.957
 -130.781 l S Q
q 1 0 0 -1 0 0 cm
6.605 -115.469 m 5.672 -116.406 l 5.188 -117.34 l 5.188 -118.73 l 5.672
 -119.664 l 6.605 -120.57 l 7.996 -121.055 l 8.898 -121.055 l 10.293 -120.57
 l 11.227 -119.664 l 11.711 -118.73 l 11.711 -117.34 l 11.227 -116.406 l
 10.293 -115.469 l S Q
q 1 0 0 -1 0 0 cm
5.188 -112.238 m 11.711 -112.238 l S Q
q 1 0 0 -1 0 0 cm
7.062 -112.238 m 5.672 -110.848 l 5.188 -109.914 l 5.188 -108.527 l 5.672
 -107.586 l 7.062 -107.137 l 11.711 -107.137 l S Q
q 1 0 0 -1 0 0 cm
7.062 -107.137 m 5.672 -105.746 l 5.188 -104.812 l 5.188 -103.422 l 5.672
 -102.488 l 7.062 -102.031 l 11.711 -102.031 l S Q
q 1 0 0 -1 0 0 cm
2.895 -99.082 m 2.895 -95.402 l S Q
q 1 0 0 -1 0 0 cm
1.449 -93.754 m 1.25 -93.754 l 0.852 -93.531 l 0.625 -93.328 l 0.43 -92.938
 l 0.43 -92.082 l 0.625 -91.691 l 0.852 -91.488 l 1.25 -91.262 l 1.676 -91.262
 l 2.07 -91.488 l 2.695 -91.883 l 4.766 -93.953 l 4.766 -91.066 l S Q
q 1 0 0 -1 0 0 cm
6.605 -76.805 m 5.672 -77.258 l 5.188 -78.652 l 5.188 -80.035 l 5.672 -81.426
 l 6.605 -81.906 l 7.516 -81.426 l 7.996 -80.52 l 8.449 -78.195 l 8.898 
-77.258 l 9.84 -76.805 l 10.293 -76.805 l 11.227 -77.258 l 11.711 -78.652
 l 11.711 -80.035 l 11.227 -81.426 l 10.293 -81.906 l S Q
q 1 0 0 -1 0 0 cm
5.188 -73.543 m 11.711 -73.543 l S Q
q 1 0 0 -1 0 0 cm
7.996 -73.543 m 6.605 -73.09 l 5.672 -72.156 l 5.188 -71.219 l 5.188 -69.832
 l S Q
q 1 0 0 -1 0 0 cm
2.895 -68.301 m 2.895 -64.586 l S Q
q 1 0 0 -1 0 0 cm
1.25 -62.52 m 1.051 -62.121 l 0.43 -61.496 l 4.766 -61.496 l S Q
q 1 0 0 -1 0 0 cm
0.117 -50.645 m 15.395 -58.973 l S Q
q 1 0 0 -1 0 0 cm
6.605 -42.762 m 5.672 -43.668 l 5.188 -44.605 l 5.188 -45.992 l 5.672 -46.926
 l 6.605 -47.863 l 7.996 -48.32 l 8.898 -48.32 l 10.293 -47.863 l 11.227
 -46.926 l 11.711 -45.992 l 11.711 -44.605 l 11.227 -43.668 l 10.293 -42.762
 l S Q
q 1 0 0 -1 0 0 cm
5.188 -39.5 m 11.711 -39.5 l S Q
q 1 0 0 -1 0 0 cm
7.062 -39.5 m 5.672 -38.113 l 5.188 -37.176 l 5.188 -35.785 l 5.672 -34.879
 l 7.062 -34.402 l 11.711 -34.402 l S Q
q 1 0 0 -1 0 0 cm
7.062 -34.402 m 5.672 -33.008 l 5.188 -32.074 l 5.188 -30.688 l 5.672 -29.781
 l 7.062 -29.293 l 11.711 -29.293 l S Q
q 1 0 0 -1 0 0 cm
2.895 -26.375 m 2.895 -22.66 l S Q
q 1 0 0 -1 0 0 cm
1.25 -20.594 m 1.051 -20.199 l 0.43 -19.57 l 4.766 -19.57 l S Q
0.425198 w
q 1 0 0 -1 0 0 cm
506.047 -283.676 m 506.047 -0.211 l S Q
q 1 0 0 -1 0 0 cm
506.047 -283.676 m 496.973 -283.676 l S Q
q 1 0 0 -1 0 0 cm
506.047 -232.148 m 496.973 -232.148 l S Q
q 1 0 0 -1 0 0 cm
506.047 -180.613 m 496.973 -180.613 l S Q
q 1 0 0 -1 0 0 cm
506.047 -129.047 m 496.973 -129.047 l S Q
q 1 0 0 -1 0 0 cm
506.047 -77.512 m 496.973 -77.512 l S Q
q 1 0 0 -1 0 0 cm
506.047 -25.984 m 496.973 -25.984 l S Q
q 1 0 0 -1 0 0 cm
506.047 -270.781 m 501.508 -270.781 l S Q
q 1 0 0 -1 0 0 cm
506.047 -257.91 m 501.508 -257.91 l S Q
q 1 0 0 -1 0 0 cm
506.047 -245.012 m 501.508 -245.012 l S Q
q 1 0 0 -1 0 0 cm
506.047 -219.246 m 501.508 -219.246 l S Q
q 1 0 0 -1 0 0 cm
506.047 -206.375 m 501.508 -206.375 l S Q
q 1 0 0 -1 0 0 cm
506.047 -193.48 m 501.508 -193.48 l S Q
q 1 0 0 -1 0 0 cm
506.047 -167.711 m 501.508 -167.711 l S Q
q 1 0 0 -1 0 0 cm
506.047 -154.844 m 501.508 -154.844 l S Q
q 1 0 0 -1 0 0 cm
506.047 -141.949 m 501.508 -141.949 l S Q
q 1 0 0 -1 0 0 cm
506.047 -116.176 m 501.508 -116.176 l S Q
q 1 0 0 -1 0 0 cm
506.047 -103.281 m 501.508 -103.281 l S Q
q 1 0 0 -1 0 0 cm
506.047 -90.41 m 501.508 -90.41 l S Q
q 1 0 0 -1 0 0 cm
506.047 -64.648 m 501.508 -64.648 l S Q
q 1 0 0 -1 0 0 cm
506.047 -51.746 m 501.508 -51.746 l S Q
q 1 0 0 -1 0 0 cm
506.047 -38.875 m 501.508 -38.875 l S Q
q 1 0 0 -1 0 0 cm
506.047 -13.113 m 501.508 -13.113 l S Q
q 1 0 0 -1 0 0 cm
506.047 -0.211 m 501.508 -0.211 l S Q
0.56693 w
q 1 0 0 -1 0 0 cm
52.5 -270.98 m 53.918 -268.793 l 55.336 -262.816 l 56.75 -259.242 l 58.172
 -261.34 l 59.586 -259.898 l 61.004 -254.848 l 62.422 -249.609 l 63.84 -247.398
 l 65.258 -252.441 l 66.676 -247.676 l 68.09 -231.887 l 69.508 -209.039 
l 70.926 -210.711 l 72.344 -233.957 l 73.762 -238.238 l 75.18 -240.906 l
 76.594 -241.242 l 78.012 -238.695 l 79.43 -235.176 l 80.848 -233.562 l 
82.266 -235.859 l 83.684 -237.531 l 85.098 -236.875 l 86.516 -234.125 l 
87.934 -232.57 l 89.352 -223.328 l 90.77 -218.988 l 92.188 -223.359 l 93.602
 -223.445 l 95.02 -220.719 l 96.438 -221.258 l 97.855 -219.105 l 99.27 -217.996
 l 100.688 -220.832 l 102.105 -223.984 l 103.52 -223.41 l 104.938 -212.02
 l 106.355 -203.488 l 107.773 -207.539 l 109.188 -214.625 l 110.605 -211.738
 l 112.023 -204.93 l 113.441 -203.258 l 114.863 -200.23 l 116.281 -200.875
 l 117.691 -203.512 l 119.113 -200.031 l 120.531 -199.262 l 121.949 -196.316
 l 123.367 -195.949 l 124.785 -192.344 l 126.199 -187.645 l 127.617 -168.875
 l 129.035 -139.762 l 130.453 -163.43 l 131.871 -189.707 l 133.289 -187.156
 l 134.707 -186.137 l 136.121 -184.07 l 137.539 -185.199 l 138.957 -186.113
 l 140.375 -184.973 l 141.793 -183.133 l 143.207 -180.383 l 144.625 -175.594
 l 146.043 -176.5 l 147.461 -176.613 l 148.879 -170.715 l 150.297 -167.855
 l 151.715 -174.629 l 153.133 -174.996 l 154.547 -169.043 l 155.965 -168.223
 l 157.383 -170.438 l 158.801 -174.406 l 160.219 -172.844 l 161.633 -167.91
 l 163.051 -164.145 l 164.469 -169.129 l 165.887 -171.512 l 167.305 -169.668
 l 168.723 -170.945 l 170.137 -168.223 l 171.555 -160.855 l 172.973 -158.984
 l 174.391 -159.547 l 175.809 -154.195 l 177.227 -154.871 l 178.641 -158.668
 l 180.059 -155.637 l 181.477 -154.926 l 182.895 -157.738 l 184.312 -153.398
 l 185.73 -144.324 l 187.148 -111.785 l 188.562 -97.723 l 189.98 -131.91
 l 191.398 -149.996 l 192.812 -150.223 l 194.23 -153.254 l 195.648 -154.449
 l 197.062 -150.051 l 198.48 -146.199 l 199.898 -143.703 l 201.316 -145.152
 l 202.738 -147.023 l 204.148 -143.902 l 205.566 -145.035 l 206.988 -142.824
 l 208.406 -136.988 l 209.824 -135.168 l 211.242 -138.289 l 212.656 -135.23
 l 214.074 -134.438 l 215.492 -137.832 l 216.91 -136.047 l 218.328 -135.367
 l 219.746 -139.566 l 221.16 -138.57 l 222.578 -132.789 l 223.996 -130.66
 l 225.414 -131.91 l 226.832 -133.898 l 228.25 -133.496 l 229.664 -133.469
 l 231.082 -131.43 l 232.5 -132.027 l 233.918 -128.055 l 235.336 -122.359
 l 236.754 -121.336 l 238.172 -122.555 l 239.59 -121.449 l 241.004 -120.52
 l 242.422 -118.699 l 243.84 -116.066 l 245.258 -79.043 l 246.676 -39.754
 l 248.09 -79.812 l 249.508 -117.512 l 250.926 -118.195 l 252.344 -116.574
 l 253.762 -117.594 l 255.18 -118.5 l 256.594 -115.273 l 258.012 -115.949
 l 259.43 -116.121 l 260.848 -116.406 l 262.266 -117.055 l 263.684 -120.031
 l 265.098 -121.621 l 266.516 -121.652 l 267.934 -117.199 l 269.352 -109.176
 l 270.77 -104.699 l 272.188 -108.441 l 273.602 -111.129 l 275.02 -110.652
 l 276.438 -110.68 l 277.855 -111.699 l 279.27 -109.43 l 280.688 -104.668
 l 282.105 -103.504 l 283.52 -105.094 l 284.938 -103.055 l 286.355 -102.32
 l 287.773 -105.207 l 289.191 -105.207 l 290.605 -108.637 l 292.023 -106.539
 l 293.441 -107.137 l 294.863 -109.43 l 296.281 -108.383 l 297.699 -103.848
 l 299.113 -103.25 l 300.531 -102.176 l 301.949 -102.258 l 303.367 -83.781
 l 304.785 -47.492 l 306.203 -63.34 l 307.617 -93.867 l 309.035 -100.758
 l 310.453 -97.188 l 311.871 -95.148 l 313.289 -95.738 l 314.707 -93.699
 l 316.121 -96.48 l 317.539 -96.137 l 318.957 -97.105 l 320.375 -95.941 
l 321.793 -92.336 l 323.207 -91.57 l 324.625 -91.629 l 326.043 -90.551 l
 327.461 -86.328 l 328.879 -84.52 l 330.297 -90.699 l 331.715 -93.473 l 
333.133 -90.324 l 334.547 -89.332 l 335.965 -90.359 l 337.383 -88.57 l 338.801
 -87.406 l 340.219 -88.57 l 341.637 -86.555 l 343.051 -85.789 l 344.469 
-86.5 l 345.887 -87.461 l 347.305 -91.656 l 348.723 -91.969 l 350.141 -84.457
 l 351.555 -86.531 l 352.973 -92.961 l 354.391 -87.805 l 355.809 -80.629
 l 357.227 -82.699 l 358.645 -82.699 l 360.059 -81.055 l 361.477 -67.48 
l 362.895 -44.715 l 364.312 -56.57 l 365.73 -79.723 l 367.148 -86.469 l 
368.562 -83.863 l 369.98 -81.738 l 371.398 -83.211 l 372.812 -83.156 l 374.23
 -82.133 l 375.648 -78.988 l 377.062 -80.461 l 378.48 -84.43 l 379.898 -84.32
 l 381.316 -80.52 l 382.738 -78.734 l 384.148 -77.879 l 385.566 -79.613 
l 386.988 -78.82 l 388.406 -75.5 l 389.824 -77.91 l 391.242 -82.277 l 392.66
 -84.031 l 394.074 -78.223 l 395.492 -70.031 l 396.91 -68.555 l 398.328 
-72.664 l 399.746 -75.277 l 401.164 -72.578 l 402.578 -68.953 l 403.996 
-69.156 l 405.414 -69.406 l 406.832 -68.359 l 408.25 -70.254 l 409.664 -69.18
 l 411.082 -64.5 l 412.5 -68.277 l 413.918 -73.004 l 415.336 -78.336 l 416.754
 -79.582 l 418.172 -73.969 l 419.59 -61.949 l 421.004 -43.188 l 422.422 
-53.219 l 423.84 -73.09 l 425.258 -74.762 l 426.676 -73.57 l 428.09 -74.508
 l 429.508 -78.504 l 430.926 -81.453 l 432.344 -80.035 l 433.762 -73.715
 l 435.18 -70.879 l 436.598 -70.992 l 438.012 -71.195 l 439.43 -70.855 l
 440.848 -68.781 l 442.266 -71.531 l 443.684 -73.656 l 445.102 -72.781 l
 446.516 -69.863 l 447.934 -63.992 l 449.352 -62.238 l 450.77 -65.578 l 
452.188 -65.441 l 453.605 -65.695 l 455.02 -67.449 l 456.438 -64.816 l 457.855
 -65.07 l 459.27 -66.773 l 460.688 -66.629 l 462.105 -67.875 l 463.52 -68.469
 l 464.938 -66.52 l 466.355 -69.035 l 467.773 -71.672 l 469.191 -68.191 
l 470.605 -69.488 l 472.023 -73.773 l 473.441 -69.27 l 474.863 -64.473 l
 476.281 -60.48 l 477.699 -51.035 l 479.113 -49.082 l 480.531 -55.09 l 481.949
 -59.316 l 483.367 -60.652 l 484.785 -62.238 l 486.203 -63.539 l 487.617
 -64.305 l 489.035 -65.695 l 490.453 -69.207 l 491.871 -67.449 l 493.289
 -63.621 l 494.707 -61.723 l 496.121 -60.281 l 497.539 -68.129 l 498.957
 -68.582 l 500.375 -64.277 l 501.793 -65.805 l 503.211 -65.637 l 504.625
 -66.656 l 506.016 -64.047 l S Q
1 0.780392 0 rg
0.283465 w
q 1 0 0 -1 0 0 cm
52.5 -264.91 m 53.918 -263.379 l 55.336 -261.855 l 56.75 -260.348 l 58.172
 -258.875 l 59.586 -257.344 l 62.422 -254.336 l 63.84 -252.836 l 65.258 
-251.332 l 66.676 -249.609 l 68.09 -236.848 l 69.508 -217.996 l 70.926 -224.406
 l 72.344 -239.32 l 73.762 -242.488 l 75.18 -241.242 l 76.594 -239.855 l
 78.012 -238.465 l 79.43 -237.047 l 80.848 -235.656 l 82.266 -234.297 l 
83.684 -232.906 l 85.098 -231.547 l 86.516 -230.191 l 87.934 -228.824 l 
90.77 -226.16 l 92.188 -224.863 l 93.602 -223.531 l 95.02 -222.195 l 96.438
 -220.895 l 97.855 -219.613 l 99.27 -218.281 l 100.688 -216.922 l 102.105
 -215.676 l 103.52 -214.488 l 104.938 -213.238 l 106.355 -212.02 l 107.773
 -210.742 l 109.188 -209.527 l 112.023 -207.086 l 116.281 -203.512 l 117.691
 -202.32 l 119.113 -201.105 l 121.949 -198.613 l 123.367 -197.562 l 124.785
 -196.426 l 126.199 -194.754 l 127.617 -170.152 l 129.035 -141.832 l 130.453
 -167.855 l 131.871 -190.219 l 133.289 -189.68 l 134.707 -188.66 l 136.121
 -187.645 l 137.539 -186.59 l 138.957 -185.488 l 140.375 -184.441 l 141.793
 -183.387 l 143.207 -182.312 l 146.043 -180.211 l 150.297 -177.156 l 151.715
 -176.105 l 153.133 -175.113 l 154.547 -174.117 l 157.383 -172.133 l 158.801
 -171.168 l 160.219 -170.18 l 161.633 -169.242 l 164.469 -167.316 l 167.305
 -165.449 l 168.723 -164.508 l 170.137 -163.605 l 171.555 -162.664 l 175.809
 -159.949 l 177.227 -159.035 l 178.641 -158.156 l 180.059 -157.281 l 181.477
 -156.371 l 182.895 -155.465 l 184.312 -154.332 l 185.73 -142.992 l 187.148
 -114.871 l 188.562 -107.957 l 189.98 -135.23 l 191.398 -150.027 l 192.812
 -149.539 l 194.23 -148.781 l 195.648 -147.953 l 197.062 -147.16 l 198.48
 -146.336 l 202.738 -143.957 l 204.148 -143.164 l 205.566 -142.367 l 206.988
 -141.609 l 208.406 -140.668 l 209.824 -139.566 l 211.242 -138.824 l 212.656
 -138.234 l 214.074 -137.527 l 215.492 -136.953 l 216.91 -136.332 l 218.328
 -135.57 l 219.746 -134.863 l 221.16 -134.152 l 222.578 -133.41 l 223.996
 -132.734 l 225.414 -132.027 l 226.832 -131.316 l 228.25 -130.609 l 229.664
 -129.926 l 232.5 -128.57 l 233.918 -127.914 l 235.336 -127.238 l 236.754
 -126.527 l 238.172 -125.902 l 239.59 -125.246 l 241.004 -124.57 l 242.422
 -123.777 l 243.84 -121.789 l 245.258 -86.387 l 246.676 -44.777 l 248.09
 -81.594 l 249.508 -117.621 l 250.926 -119.98 l 252.344 -119.551 l 253.762
 -118.953 l 255.18 -118.363 l 256.594 -117.77 l 258.012 -117.168 l 260.848
 -115.984 l 262.266 -115.41 l 263.684 -114.844 l 265.098 -114.281 l 266.516
 -113.688 l 267.934 -113.148 l 270.77 -112.012 l 272.188 -111.473 l 273.602
 -110.906 l 275.02 -110.336 l 276.438 -109.801 l 280.688 -108.188 l 282.105
 -107.648 l 283.52 -107.137 l 284.938 -106.625 l 287.773 -105.438 l 289.191
 -104.984 l 290.605 -104.531 l 292.023 -104.043 l 293.441 -103.535 l 294.863
 -103.027 l 296.281 -102.52 l 297.699 -102.031 l 299.113 -101.551 l 300.531
 -100.953 l 301.949 -99.594 l 303.367 -72.043 l 304.785 -37.996 l 306.203
 -64.953 l 307.617 -93.902 l 309.035 -97.445 l 310.453 -97.668 l 311.871
 -97.242 l 313.289 -96.762 l 314.707 -96.305 l 316.121 -95.879 l 317.539
 -95.285 l 318.957 -94.66 l 320.375 -94.293 l 321.793 -93.902 l 323.207 
-93.449 l 324.625 -92.961 l 326.043 -92.652 l 327.461 -92.312 l 330.297 
-91.117 l 331.715 -90.895 l 333.133 -90.637 l 334.547 -90.211 l 335.965 
-89.785 l 337.383 -89.363 l 338.801 -88.965 l 341.637 -88.113 l 343.051 
-87.719 l 344.469 -87.293 l 345.887 -86.836 l 347.305 -86.5 l 348.723 -86.105
 l 350.141 -85.676 l 351.555 -85.281 l 355.809 -84.176 l 357.227 -83.781
 l 358.645 -83.324 l 360.059 -82.473 l 361.477 -62.32 l 362.895 -37.32 l
 364.312 -55.605 l 365.73 -74.621 l 367.148 -78.957 l 368.562 -80.801 l 
369.98 -80.488 l 371.398 -80.152 l 372.812 -79.781 l 374.23 -79.445 l 375.648
 -79.129 l 381.316 -77.773 l 382.738 -77.457 l 384.148 -77.117 l 385.566
 -76.805 l 386.988 -76.465 l 391.242 -75.531 l 392.66 -75.219 l 394.074 
-74.961 l 395.492 -74.707 l 396.91 -74.422 l 398.328 -74.168 l 401.164 -73.488
 l 402.578 -73.348 l 403.996 -73.176 l 405.414 -72.918 l 408.25 -72.41 l
 409.664 -72.188 l 411.082 -71.957 l 412.5 -71.703 l 413.918 -71.504 l 415.336
 -71.246 l 416.754 -70.941 l 418.172 -69.008 l 419.59 -55.691 l 421.004 
-39.699 l 422.422 -48.406 l 423.84 -63.398 l 425.258 -67.988 l 426.676 -68.699
 l 428.09 -68.953 l 429.508 -69.008 l 430.926 -68.812 l 432.344 -68.5 l 
433.762 -68.414 l 435.18 -68.301 l 436.598 -68.02 l 438.012 -67.789 l 439.43
 -67.535 l 440.848 -67.535 l 442.266 -67.449 l 445.102 -67.113 l 446.516
 -66.969 l 447.934 -66.797 l 449.352 -66.656 l 450.77 -66.488 l 452.188 
-66.371 l 453.605 -66.234 l 455.02 -66.117 l 456.438 -65.98 l 457.855 -65.832
 l 459.27 -65.75 l 460.688 -65.609 l 462.105 -65.527 l 463.52 -65.441 l 
464.938 -65.324 l 467.773 -65.156 l 469.191 -65.039 l 470.605 -64.988 l 
473.441 -64.816 l 474.863 -64.699 l 476.281 -61.836 l 477.699 -51.863 l 
479.113 -46.363 l 480.531 -55.996 l 481.949 -62.973 l 483.367 -63.68 l 484.785
 -64.195 l 486.203 -64.387 l 487.617 -64.387 l 489.035 -64.363 l 493.289
 -64.363 l 494.707 -64.332 l 496.121 -64.219 l 497.539 -64.109 l 500.375
 -64.332 l 501.793 -64.305 l S Q
1 0 0 rg
q 1 0 0 -1 0 0 cm
52.5 -265.398 m 53.918 -263.832 l 55.336 -262.305 l 56.75 -260.801 l 58.172
 -259.301 l 59.586 -257.773 l 61.004 -256.293 l 62.422 -254.762 l 63.84 
-253.262 l 65.258 -251.758 l 66.676 -250.031 l 68.09 -236.906 l 69.508 -217.43
 l 70.926 -224.094 l 72.344 -239.512 l 73.762 -242.914 l 75.18 -241.613 
l 76.594 -240.25 l 78.012 -238.863 l 79.43 -237.449 l 80.848 -236.055 l 
82.266 -234.699 l 83.684 -233.305 l 85.098 -231.949 l 86.516 -230.555 l 
87.934 -229.199 l 90.77 -226.531 l 92.188 -225.145 l 93.602 -223.75 l 95.02
 -222.504 l 96.438 -221.234 l 97.855 -219.926 l 99.27 -218.594 l 100.688
 -217.238 l 102.105 -215.988 l 103.52 -214.793 l 106.355 -212.301 l 107.773
 -211.027 l 109.188 -209.805 l 110.605 -208.562 l 112.023 -207.34 l 114.863
 -204.957 l 116.281 -203.738 l 117.691 -202.551 l 119.113 -201.328 l 120.531
 -200.082 l 121.949 -198.812 l 123.367 -197.758 l 124.785 -196.57 l 126.199
 -194.898 l 127.617 -169.984 l 129.035 -141.293 l 130.453 -167.625 l 131.871
 -190.305 l 133.289 -189.793 l 134.707 -188.777 l 136.121 -187.723 l 137.539
 -186.652 l 138.957 -185.598 l 140.375 -184.551 l 141.793 -183.473 l 143.207
 -182.398 l 144.625 -181.32 l 146.043 -180.297 l 147.461 -179.219 l 150.297
 -177.18 l 151.715 -176.156 l 153.133 -175.137 l 154.547 -174.117 l 160.219
 -170.152 l 161.633 -169.211 l 163.051 -168.223 l 164.469 -167.285 l 165.887
 -166.32 l 167.305 -165.363 l 168.723 -164.449 l 170.137 -163.52 l 171.555
 -162.582 l 172.973 -161.648 l 177.227 -158.926 l 178.641 -158.02 l 180.059
 -157.113 l 181.477 -156.234 l 182.895 -155.324 l 184.312 -154.195 l 185.73
 -142.738 l 187.148 -114.652 l 188.562 -108.043 l 189.98 -135.199 l 191.398
 -149.824 l 192.812 -149.344 l 194.23 -148.578 l 195.648 -147.754 l 197.062
 -146.906 l 198.48 -146.113 l 202.738 -143.734 l 204.148 -142.941 l 205.566
 -142.148 l 206.988 -141.348 l 208.406 -140.414 l 209.824 -139.363 l 211.242
 -138.629 l 212.656 -138.004 l 214.074 -137.27 l 215.492 -136.699 l 216.91
 -136.047 l 218.328 -135.316 l 219.746 -134.574 l 221.16 -133.863 l 222.578
 -133.129 l 223.996 -132.449 l 225.414 -131.711 l 226.832 -131.031 l 228.25
 -130.293 l 229.664 -129.613 l 232.5 -128.254 l 233.918 -127.605 l 235.336
 -126.918 l 236.754 -126.211 l 238.172 -125.586 l 239.59 -124.906 l 241.004
 -124.254 l 242.422 -123.438 l 243.84 -121.363 l 245.258 -85.223 l 246.676
 -43.105 l 248.09 -80.801 l 249.508 -117.367 l 250.926 -119.664 l 252.344
 -119.211 l 253.762 -118.648 l 255.18 -118.023 l 256.594 -117.426 l 258.012
 -116.863 l 259.43 -116.262 l 260.848 -115.668 l 262.266 -115.105 l 263.684
 -114.531 l 265.098 -113.965 l 266.516 -113.371 l 267.934 -112.832 l 270.77
 -111.699 l 272.188 -111.16 l 273.602 -110.621 l 276.438 -109.488 l 277.855
 -108.949 l 279.27 -108.441 l 280.688 -107.902 l 282.105 -107.395 l 283.52
 -106.855 l 284.938 -106.34 l 286.355 -105.777 l 287.773 -105.18 l 289.191
 -104.73 l 290.605 -104.277 l 292.023 -103.789 l 293.441 -103.25 l 296.281
 -102.289 l 297.699 -101.805 l 299.113 -101.27 l 300.531 -100.699 l 301.949
 -99.367 l 303.367 -71.758 l 304.785 -37.773 l 306.203 -64.953 l 307.617
 -93.867 l 309.035 -97.301 l 310.453 -97.496 l 313.289 -96.59 l 314.707 
-96.164 l 316.121 -95.688 l 317.539 -95.117 l 318.957 -94.523 l 320.375 
-94.18 l 321.793 -93.754 l 323.207 -93.328 l 324.625 -92.848 l 326.043 -92.508
 l 327.461 -92.199 l 330.297 -91.066 l 331.715 -90.781 l 333.133 -90.527
 l 334.547 -90.125 l 335.965 -89.703 l 337.383 -89.305 l 338.801 -88.879
 l 340.219 -88.488 l 341.637 -88.062 l 343.051 -87.66 l 345.887 -86.812 
l 347.305 -86.445 l 348.723 -86.043 l 350.141 -85.652 l 351.555 -85.25 l
 352.973 -84.883 l 354.391 -84.543 l 355.809 -84.148 l 357.227 -83.781 l
 358.645 -83.355 l 360.059 -82.5 l 361.477 -62.574 l 362.895 -37.914 l 364.312
 -56.055 l 365.73 -74.938 l 367.148 -79.105 l 368.562 -80.863 l 369.98 -80.547
 l 371.398 -80.207 l 372.812 -79.863 l 374.23 -79.527 l 375.648 -79.188 
l 377.062 -78.871 l 379.898 -78.195 l 381.316 -77.879 l 382.738 -77.539 
l 384.148 -77.234 l 385.566 -76.895 l 386.988 -76.609 l 391.242 -75.668 
l 392.66 -75.387 l 394.074 -75.105 l 396.91 -74.594 l 398.328 -74.336 l 
399.746 -74.031 l 401.164 -73.656 l 402.578 -73.488 l 403.996 -73.348 l 
405.414 -73.09 l 406.832 -72.863 l 408.25 -72.613 l 409.664 -72.383 l 411.082
 -72.125 l 412.5 -71.871 l 413.918 -71.672 l 415.336 -71.48 l 416.754 -71.164
 l 418.172 -69.293 l 419.59 -56.484 l 421.004 -41.031 l 422.422 -49.363 
l 423.84 -63.855 l 425.258 -68.328 l 426.676 -69.008 l 428.09 -69.238 l 
429.508 -69.27 l 430.926 -69.07 l 432.344 -68.754 l 433.762 -68.668 l 435.18
 -68.531 l 436.598 -68.301 l 438.012 -68.074 l 439.43 -67.82 l 440.848 -67.789
 l 442.266 -67.703 l 443.684 -67.535 l 445.102 -67.398 l 446.516 -67.223
 l 447.934 -67.055 l 449.352 -66.941 l 450.77 -66.773 l 452.188 -66.656 
l 453.605 -66.52 l 455.02 -66.406 l 456.438 -66.258 l 460.688 -65.918 l 
462.105 -65.832 l 464.938 -65.609 l 466.355 -65.551 l 467.773 -65.441 l 
469.191 -65.355 l 470.605 -65.27 l 472.023 -65.211 l 473.441 -65.125 l 474.863
 -64.988 l 476.281 -62.32 l 477.699 -52.965 l 479.113 -47.75 l 480.531 -56.789
 l 481.949 -63.367 l 483.367 -64.047 l 484.785 -64.5 l 486.203 -64.699 l
 487.617 -64.699 l 489.035 -64.672 l 490.453 -64.672 l 491.871 -64.648 l
 494.707 -64.648 l 496.121 -64.531 l 497.539 -64.418 l 500.375 -64.648 l
 501.793 -64.613 l S Q
Q Q
showpage
%%Trailer
end
%%EOF
\end{filecontents}

%% *-----------------------------------------------------------------------------------------*

\documentclass[11pt]{article}

\usepackage{hrms}
\usepackage{epsfig,graphics,wrapfig}

%% *-----------------------------------------------------------------------------------------*

\title{SELF AND N$_2$ COLLISIONAL BROADENING OF FAR-INFRARED METHANE LINES AT LOW TEMPERATURE WITH APPLICATION TO TITAN}

\author{\underline{\FirstName C. \LastName RICHARD},
  \FirstName V. \LastName BOUDON}
\address{Laboratoire Interdisciplinaire Carnot de Bourgogne, UMR 6303 CNRS - Universit\'e Bourgogne Franche-Comt\'e, 9 Av. A. Savary, BP 47870, F-21078 Dijon Cedex, France}
\author{\FirstName L. \LastName MANCERON}
\address{AILES, Synchrotron SOLEIL, L'Orme des Merisiers Saint-Aubin, F-91192 Gif-sur-Yvette, France}
\author{\FirstName J. \LastName VANDER AUWERA}
\address{SQUARES, C.P. 160/09, Universit\'e Libre de Bruxelles, B-1050 Brussels, Belgium}
\author{\FirstName S. \LastName VINATIER, 
  \FirstName B. \LastName B\'EZARD, 
  \FirstName M. \LastName HOUELLE}
\address{LESIA, Observatoire de Paris, Universit\'e PSL, Sorbonne Universit\'e, Universit\'e Paris Cit\'e, CNRS, 5 place Jules Janssen, 92195 Meudon, France}
%% *-----------------------------------------------------------------------------------------*

%% The macros below will change the page head and foot.
%% Please, do not modify the content of the \fancyhead macro nor the \fancyfoot line.
\usepackage{fancyhdr}
\pagestyle{fancy}
\fancyhead[C]{{\footnotesize \textit{HRMS, 28th Colloquium, Dijon, France,
  Aug. 28 - Sept. 1, 2023}}}
\fancyfoot[C]{}
\renewcommand{\headrulewidth}{0.6pt}
\renewcommand{\footrulewidth}{0.6pt}

%% WARNING: Make sure that this package comes LAST since it re-defines many LaTeX macros.
\usepackage[colorlinks=true,urlcolor=blue,linkcolor=blue,citecolor=blue]{hyperref}
\voffset -.65 cm

%% *-----------------------------------------------------------------------------------------*

\category {8,3}
\begin{document}

\maketitle

\index{UV}
\index{Laser}
\index{Electric field}

\begin{wrapfigure}[12]{r}{7cm}
% \vspace{-.5cm}
%\hspace*{1cm}
\epsfig{file=figure_methane_Titan.eps,width=7cm}
\end{wrapfigure}
We report the measurement of broadening coefficients of pure rotational lines of methane at different pressure and temperature conditions. A total of 27 far-infrared spectra were recorded at the AILES beamline of the SOLEIL synchrotron at room-temperature, 200 K and 120 K, in a range of 10 to 800 mbar. Self and N$_2$ broadening coefficients and temperature dependence exponents of methane pure rotational lines have been measured in the 73--136 cm$^{-1}$ spectral range using multi-spectrum non-linear least squares fitting of Voigt profiles. These coefficients were used to model spectra of Titan that were compared to a selection of equatorial Cassini/CIRS spectra, showing a good agreement for a stratospheric methane mole fraction of (1.17 $\pm$ 0.08)\%.

\end{document}
